Type 2 Service

Type 2 SAP Component

Type 2

Connection

Component

Ack

Timer

Operator

Busy

Timer

P

Timer

REJ

Timer

Type 2

Connection

Component

Ack

Timer

Busy

Timer

P

Timer

REJ

Timer