LSAP

PSAP

                                                                                                            Types 1 & 2 Station Component

Type 1 Service

Class B (Types 1 & 2)  Datalink Layer Architecture

Network Layer

Physical Layer

Operator

                                                                                                            OSAP

Type 2 Service