      D_CONN

RSET

                  Type 2 Connection Component: State Diagram

RSET

RESET RESET_CHE CK ADM

RESET_WAI T ERROR

BUSY

NORMAL

2, 7, 12-24

1-A 1-B

8, 25 10, 11

6, 9

5

4

                                                                                                     3

See transitions

for NORMAL